Title: Vocabulaire médicale RSNE (Français vers Anglais) / X - Orthopédie / Orthopédie 3
Tags: 3 Orthopédie

sentence: La kinésithérapie
sentence english: Physiotherapy

sentence: Une/la luxation
sentence english: Dislocation

sentence: Une/la lombalgie
sentence english: Low back pain

sentence: Une/la myalgie
sentence english: Myalgia

sentence: Un/le nerf crural
sentence english: Crural nerve

sentence: Un/le nerf sciatique
sentence english: Sciatic nerve

sentence: L'orthopédie
sentence english: Orthopedics

sentence: L'ostéoporose
sentence english: Osteoporosis

sentence: Une/la paralysie
sentence english: Paralysis

sentence: Une/la paraplégie
sentence english: Paraplegia

sentence: Une/la polyarthrite
sentence english: Polyarthritis

sentence: Un/le rachis
sentence english: Spine

sentence: Un/le rhumatisme
sentence english: Rheumatism

sentence: Une/la scoliose
sentence english: Scoliosis

sentence: Une/la tendinite
sentence english: Tendinitis

sentence: Un/le traumatisme
sentence english: trauma

sentence: Un/l'appareil locomoteur, un/le squelette
sentence english: Musculoskeletal system