Title: Vocabulaire médicale RSNE (Français vers Anglais) / I - Procédures / Procédures 2
Tags: 2 Procédures

sentence: Vous ne devez pas aller aux toilettes sans nous avertir.
sentence english: You must not go to the toilet without letting us know.

sentence: L’injection pourrait produire une sensation de sécheresse dans la bouche ou une envie de dormir.
sentence english: The injection may cause a feeling of dryness in your mouth or drowsiness

sentence: Cette piqûre pourrait causer une bouche sèche ou une envie de dormir
sentence english: This shot may make your mouth dry and make you drowsy.

sentence: Des/les infiltrations épidurales
sentence english: an epidural injection, drip

sentence: Une/la tomodensitométrie
sentence english: CAT scan, CT scan

sentence: Une/l'échographie
sentence english: ultrasound

sentence: Une/la prise de sang
sentence english: blood test

sentence: Une/la radiographie
sentence english: x-ray

sentence: Un/le scanner
sentence english: (CT) scanner

sentence: Un/l'IRM
sentence english: MRI

sentence: Une/la mastectomie
sentence english: mastectomy

sentence: Une/la circoncision
sentence english: circumcision

sentence: Une/l'amniocentèse
sentence english: amniocentesis

sentence: Un/l'antibiotique
sentence english: an antibiotic

sentence: Un/le stent
sentence english: a stent

sentence: Une/la coelioscopie
sentence english: celioscopy

sentence: Une/l'arthroscopie
sentence english: arthroscopy

sentence: Une/la biopsie
sentence english: a biopsy

sentence: Une/l'hystérectomie
sentence english: a hysterectomy

sentence: Une/l’hormonothérapie
sentence english: hormone therapy

sentence: Une/la tomographie
sentence english: tomography

sentence: Une/la procédure thérapeutique
sentence english: therapeutic procedure

sentence: Une/la procédure préventive
sentence english: precautionary procedure

sentence: Une/la procédure diagnostique
sentence english: diagnostic procedure