Title: Vocabulaire médicale RSNE (Français vers Anglais) / W - Investigations / Investigations 3
Tags: 3 Investigations

sentence: Du/Le fer
sentence english: Iron

sentence: Une/l'estimation du Débit de Filtration Glomérulaire (dfge)
sentence english: Estimated Glomerular Filtration Rate (egfr)

sentence: Une/la créatinine
sentence english: Creatinine

sentence: Un/le test de fonction hépatique
sentence english: Liver function test

sentence: Des/les enzymes hépatiques
sentence english: Liver enzymes

sentence: Une/l'albumine
sentence english: Albumin

sentence: Une/la bilirubine
sentence english: Bilirubin

sentence: Une/la thyréostimuline
sentence english: Thyroid stimulating hormone (TSH)

sentence: Des/les hormones thyroïdiennes (T3 et T4)
sentence english: Thyroid hormone (T3 and T4)

sentence: Un/le glucose
sentence english: Glucose

sentence: Une/l'hémoglobine glyquée
sentence english: Hemoglobin A1c (hba1c)

sentence: Un/l'acide urique
sentence english: Uric acid

sentence: Un/le sodium
sentence english: Sodium

sentence: Un/le potassium
sentence english: Potassium

sentence: Un/le magnésium
sentence english: Magnesium

sentence: Un/le calcium
sentence english: Calcium

sentence: Un/le phosphate
sentence english: Phosphate

sentence: Un/le rapport international normalisé (RIN)
sentence english: International Normalized Ratio (INR)

sentence: Un/l'antigène spécifique de la prostate (APS)
sentence english: Prostate Specific Antigen (PSA)