Title: Vocabulaire médicale RSNE (Français vers Anglais) / X - Orthopédie / Orthopédie 2
Tags: 2 Orthopédie

sentence: Un/l'humérus
sentence english: Humerus

sentence: Un/le radius
sentence english: Radius

sentence: Un/l'ulna ou un/le cubitus
sentence english: Ulna

sentence: Un/le fémur
sentence english: Femur

sentence: Un/le tibia
sentence english: Tibia

sentence: Une/la fibula ou le/un péroné
sentence english: Fibula

sentence: Un/le muscle
sentence english: Muscle

sentence: Un/le tendon
sentence english: Tendon

sentence: Un/le biceps
sentence english: Biceps

sentence: Un/le triceps
sentence english: Triceps

sentence: Une/lla boulette, une/la rotule
sentence english: kneecap

sentence: Se démancher, se luxer
sentence english: to dislocate

sentence: Une/l'algie
sentence english: A pain

sentence: Une/la contention
sentence english: Restraint

sentence: Une/la cyphose
sentence english: Cyphosis

sentence: Un/le pied équin
sentence english: Equine foot

sentence: Une/la fracture
sentence english: Fracture

sentence: Une/le trouble fonctionnel
sentence english: Functional disorder

sentence: Une/la béquillle
sentence english: A crutch

sentence: Une/la hernie discale
sentence english: Herniated disc