Title: Vocabulaire médicale RSNE (Français vers Anglais) / S - Chirurgie / Chirurgie 2
Tags: 2 Chirurgie

sentence: Une/la transplantation
sentence english: Transplant

sentence: Une/la greffe
sentence english: Transplant

sentence: Une/la chirurgie ouverte
sentence english: Open surgery

sentence: Minimalement invasif
sentence english: Minimally invasive

sentence: Un/le laser
sentence english: Laser

sentence: Une/la transfusion sanguine
sentence english: Blood transfusion

sentence: Une/l'anesthésie
sentence english: Anesthesia

sentence: Une/la résection
sentence english: Resection

sentence: Une/l'excision
sentence english: Excision

sentence: Une/la cicatrice
sentence english: Scar

sentence: Laparoscopique
sentence english: Laparoscopic

sentence: Une/l'infection postopératoire
sentence english: Postoperative infections

sentence: Un/le suivi
sentence english: Follow up

sentence: Une/la perte de sang
sentence english: Blood loss

sentence: Une/l'appendicectomie
sentence english: Appendectomy

sentence: Une/la cholécystectomie
sentence english: Cholecystectomy

sentence: Une/l'hystérectomie
sentence english: Hysterectomy

sentence: Une/la circoncision
sentence english: Circumcision

sentence: Un/le pontage coronarien
sentence english: Coronary Artery Bypass Graft

sentence: Un/l'enlèvement de la cataracte
sentence english: Cataract removal

sentence: Une/la colonoscopie
sentence english: Colonoscopy

sentence: Une/l'arthroplastie du genou
sentence english: Knee arthroplasty

sentence: Une/l'endoscopie
sentence english: Endoscopy