Title: Medical vocabulary RSNE (English to French) / S - Surgery / Surgery 1

sentence: Une/la chirurgie
sentence english: Surgery

sentence: Des/les gants
sentence english: Gloves

sentence: Un/le masque
sentence english: Mask

sentence: Un/le lavage chirurgical
sentence english: Scrub

sentence: Un/le champ stérile
sentence english: Sterile feild

sentence: Des/les ciseaux
sentence english: Scissors

sentence: Un/le bistouri
sentence english: Scalpel

sentence: Une/la suture
sentence english: Suture

sentence: Une/la rétractation
sentence english: Retract

sentence: Une/l'incision
sentence english: Incision

sentence: Un/le cathéter
sentence english: Catheder

sentence: Un/l'hématome
sentence english: Hematoma

sentence: Une/la rupture
sentence english: Rupture

sentence: Une/l'allergie aux médicaments
sentence english: Drug allergy

sentence: Un/le pansement
sentence english: Dressing/Bandages

sentence: Une/la ligne intraveineuse
sentence english: Intravenous line

sentence: Mesurer la quantité d'urine
sentence english: Measuring urine output

sentence: Mesurer le débit d'urine
sentence english: Measuring urine output

sentence: Un(e) chirurgien(ne)
sentence english: Surgeon

sentence: Un(e) thérapeute respiratoire
sentence english: Respiratory therapist

sentence: Un(e) anesthésiste/anesthésiologiste
sentence english: Anesthesiologist

sentence: Une/l'urgence
sentence english: Emergency

sentence: Cosmétique
sentence english: Cosmetic

sentence: Une/l'amputation
sentence english: Amputation